<template>
  <footer class="footer">
    <div class="container">
      <div class="footer__wrapper">
        <div class="footer__main">
          <div class="footer__left">
            <nuxt-link-locale to="/" class="footer__logo">
              SCHON
            </nuxt-link-locale>
            <p class="footer__text">{{ t('footer.text') }}</p>
          </div>
          <div class="footer__columns">
            <div class="footer__column">
              <h6>{{ t('footer.shop') }}</h6>
              <nuxt-link-locale to="/shop">{{ t('footer.allProducts') }}</nuxt-link-locale>
              <nuxt-link-locale to="/catalog">{{ t('footer.catalog') }}</nuxt-link-locale>
              <nuxt-link-locale to="/brands">{{ t('footer.brands') }}</nuxt-link-locale>
            </div>
            <div class="footer__column">
              <h6>{{ t('footer.help') }}</h6>
              <nuxt-link-locale to="/contact">{{ t('contact.title') }}</nuxt-link-locale>
              <nuxt-link-locale to="/docs/privacy-policy">{{ t('docs.policy.title') }}</nuxt-link-locale>
              <nuxt-link-locale to="/docs/terms-and-conditions">{{ t('docs.terms.title') }}</nuxt-link-locale>
              <nuxt-link-locale to="/docs/shipping-information">{{ t('docs.shipping.title') }}</nuxt-link-locale>
              <nuxt-link-locale to="/docs/return-policy">{{ t('docs.return.title') }}</nuxt-link-locale>
              <nuxt-link-locale to="/docs/about-us">{{ t('docs.about.title') }}</nuxt-link-locale>
              <nuxt-link-locale to="/docs/faq">{{ t('docs.faq.title') }}</nuxt-link-locale>
            </div>
          </div>
        </div>
        <div class="footer__bottom">
          <p>© {{ actualYear }} Schon. {{ t('footer.rights') }}</p>
        </div>
      </div>
    </div>
  </footer>
</template>

<script setup lang="ts">
const companyStore = useCompanyStore();
const { t } = useI18n();

const companyInfo = computed(() => companyStore.companyInfo);
const actualYear = computed(() => new Date().getFullYear());

const encodedCompanyAddress = computed(() => {
  return companyInfo.value?.companyAddress ? encodeURIComponent(companyInfo.value?.companyAddress) : '';
});
</script>

<style scoped lang="scss">
.footer {
  background-color: #000;

  &__wrapper {
    padding-block: 64px;
    display: flex;
    flex-direction: column;
    gap: 50px;
  }

  &__main {
    display: flex;
    align-items: flex-start;
    justify-content: space-between;
  }

  &__left {
    display: flex;
    flex-direction: column;
    gap: 20px;
  }

  &__logo {
    color: #fff;
    font-size: 24px;
    font-weight: 600;
    letter-spacing: 6.7px;
    font-family: 'Playfair Display', sans-serif;

    @include hover {
      text-shadow: 0 0 5px #fff;
    }
  }

  &__text {
    max-width: 285px;
    color: #d1d5db;
    font-size: 16px;
    font-weight: 400;
    letter-spacing: -0.5px;
  }

  &__columns {
    display: flex;
    align-items: flex-start;
    gap: 150px;
  }

  &__column {
    display: flex;
    flex-direction: column;
    gap: 14px;

    & h6 {
      color: #d2d0d0;
      font-size: 16px;
      font-weight: 600;
      letter-spacing: -0.5px;
    }

    & p, a {
      color: $link_secondary;
      font-size: 16px;
      font-weight: 400;
      letter-spacing: -0.5px;

      @include hover {
        color: $link_secondary_hover;
      }
    }
  }

  &__bottom {
    & p {
      color: $link_secondary;
      font-size: 14px;
      font-weight: 400;
      letter-spacing: -0.5px;
    }
  }
}
</style>